/GeV Tp 1 10^210

/mean T 1/pσ

0.8

0.9

1

1.1

1.2_{GLD}

GLDPrime GLD4LDC

= 1978 mm) TPC (B=3.0 T, R = 1740 mm) TPC (B=3.5 T, R = 1540 mm) TPC (B=4.0 T, R

b)